\documentclass[12pt]{sop}
\title{Personal Protective Clothing Level}
\date{7/24/08}
\author{Harper}
\approved{Chief Harper}
\begin{document}
\maketitle
\section{Procedures}
\subsection{Structure Fires}
\begin{enumerate}
\item All firefighters operating in the ``hot zone'' of a structure fire will be in
full turnouts to include coat, pants, helmet, hood, gloves and boots. When operating
in an IDLH atmosphere an SCBA shall be worn.
\item Engineers when operating close to the incident and exposed to products of
combustion shall also be in full PPE including SCBA. If outside the ``hot zone''
engineers will be allowed to modify their PPE accordingly. If the Engineer is
considered to be a part of the RIT team, then full PPE including an SCBA shall be
worn.

\end{enumerate}
\end{document}